05101520253035404512.0

08.0

04.0

11:23:00.0

29:30.0

-3:30:00.0

30.0

31:00.0

32:00.0

RA (J2000)

Dec (J2000)

OBSID 00537195000 / DATE-OBS 2012-10-31T22:51:50.7

UVOT Finding Chart