02040608010012014042.0

38.0

34.0

18:03:30.0

56:00.0

30.0

-16:57:00.0

58:00.0

59:00.0

RA (J2000)

Dec (J2000)

OBSID 00537266000 / DATE-OBS 2012-11-02T02:28:10.2

UVOT Finding Chart