051015202530354018:03:40.0

36.0

32.0

56:00.0

30.0

-16:57:00.0

58:00.0

59:00.0

RA (J2000)

Dec (J2000)

OBSID 00537266000 / DATE-OBS 2012-11-02T02:31:42.2

UVOT Finding Chart