0510152025303556.0

5:32:50.0

44.0

38.0

30.0

29:00.0

54:28:00.0

27:00.0

RA (J2000)

Dec (J2000)

OBSID 00537921000 / DATE-OBS 2012-11-08T17:48:52.6

UVOT Finding Chart