012345678904.0

0:54:00.0

56.0

53:52.0

56:00.0

30.0

-42:57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00540178000 / DATE-OBS 2012-12-01T12:30:29.8

UVOT Finding Chart