0.51.52.53.54.552:00.0

40.0

20.0

11:51:00.0

04:00.0

30.0

03:00.0

78:02:00.0

01:00.0

00:30.0

RA (J2000)

Dec (J2000)

OBSID 00541371000 / DATE-OBS 2012-12-12T07:01:08.4

UVOT Finding Chart