0246810121416182020:45:50.0

20:45:40.0

51:00.0

30.0

49:50:00.0

49:00.0

48:00.0

47:30.0

RA (J2000)

Dec (J2000)

OBSID 00544784000 / DATE-OBS 2013-01-02T18:15:47.9

UVOT Finding Chart