051015202530354045505552.0

46.0

20:45:40.0

34.0

51:00.0

30.0

49:50:00.0

49:00.0

48:00.0

47:30.0

RA (J2000)

Dec (J2000)

OBSID 00544784000 / DATE-OBS 2013-01-02T18:25:28.8

UVOT Finding Chart