02468101214161838.0

34.0

11:24:30.0

26.0

22.0

06:00.0

30.0

48:05:00.0

04:00.0

03:30.0

RA (J2000)

Dec (J2000)

OBSID 00547407000 / DATE-OBS 2013-01-31T14:10:50.1

UVOT Finding Chart