2000

2500

3000

3500

4000

4500

5000

20.0

15:46:00.0

40.0

45:20.0

12:00.0

14:00.0

16:00.0

18:00.0

-0:20:00.0

22:00.0

24:00.0

26:00.0

28:00.0

30:00.0

RA (J2000)

Dec (J2000)

OBSID 00550906000 / DATE-OBS 2013-03-13T16:09:42.8

UVOT Finding Chart