051015202548.0

44.0

15:45:40.0

36.0

-0:20:00.0

30.0

21:00.0

22:00.0

23:00.0

RA (J2000)

Dec (J2000)

OBSID 00550906000 / DATE-OBS 2013-03-13T16:09:42.8

UVOT Finding Chart