0510152025306:08:00.0

07:50.0

45:00.0

30.0

55:44:00.0

43:00.0

42:00.0

RA (J2000)

Dec (J2000)

OBSID 00552063000 / DATE-OBS 2013-03-27T01:49:28.4

UVOT Finding Chart