1800

2000

2200

2400

2600

2800

3000

3200

3400

3600

3800

09:00.0

30.0

6:08:00.0

07:00.0

52:00.0

50:00.0

48:00.0

46:00.0

44:00.0

42:00.0

55:40:00.0

38:00.0

36:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00552063000 / DATE-OBS 2013-03-27T01:53:01.2

UVOT Finding Chart