012345604.0

18:03:00.0

02:56.0

21:00.0

30.0

21:20:00.0

19:00.0

18:00.0

RA (J2000)

Dec (J2000)

OBSID 00552142000 / DATE-OBS 2013-03-28T02:19:02.6

UVOT Finding Chart