010203040506070809010011042.0

38.0

34.0

18:24:30.0

51:00.0

30.0

-24:52:00.0

53:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 00552369000 / DATE-OBS 2013-03-30T15:12:48.2

UVOT Finding Chart