0102030405060708028.0

24.0

5:34:20.0

16.0

30.0

29:00.0

21:28:00.0

27:00.0

26:30.0

RA (J2000)

Dec (J2000)

OBSID 00552380000 / DATE-OBS 2013-03-30T17:39:39.1

UVOT Finding Chart