02468101214161814.0

9:56:10.0

06.0

02.0

30.0

41:00.0

13:40:00.0

39:00.0

38:30.0

RA (J2000)

Dec (J2000)

OBSID 00553847000 / DATE-OBS 2013-04-18T19:03:22.1

UVOT Finding Chart