02468101230.0

13:04:20.0

10.0

27:00.0

30.0

59:26:00.0

25:00.0

24:00.0

RA (J2000)

Dec (J2000)

OBSID 00553977000 / DATE-OBS 2013-04-20T07:43:32.4

UVOT Finding Chart