0246810121412:12:36.0

12:12:30.0

12:12:24.0

30.0

24:00.0

54:23:00.0

22:00.0

RA (J2000)

Dec (J2000)

OBSID 00553996000 / DATE-OBS 2013-04-20T13:58:48.9

UVOT Finding Chart