0102030405060708015:43:00.0

50.0

42:40.0

30.0

31:00.0

58:30:00.0

29:00.0

28:30.0

RA (J2000)

Dec (J2000)

OBSID 00554135000 / DATE-OBS 2013-04-21T21:17:00.2

UVOT Finding Chart