0510152025303540455020:59:40.0

36.0

32.0

31:30.0

32:00.0

30.0

-22:33:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00554635000 / DATE-OBS 2013-04-27T13:22:19.8

UVOT Finding Chart