01234567891024.0

9:14:20.0

16.0

12.0

07:00.0

30.0

08:00.0

09:00.0

-0:10:00.0

RA (J2000)

Dec (J2000)

OBSID 00554996000 / DATE-OBS 2013-05-02T17:55:49.8

UVOT Finding Chart