01020304050607034.0

18:09:30.0

26.0

22.0

19:00.0

30.0

-16:20:00.0

21:00.0

22:00.0

RA (J2000)

Dec (J2000)

OBSID 00555096000 / DATE-OBS 2013-05-04T02:07:13.2

UVOT Finding Chart