024681012141618202218.0

14.0

9:08:10.0

06.0

30.0

17:30:00.0

29:00.0

28:00.0

27:30.0

RA (J2000)

Dec (J2000)

OBSID 00555163000 / DATE-OBS 2013-05-05T08:24:25.6

UVOT Finding Chart