0510152025303522.0

18.0

14.0

20:21:10.0

30.0

58:00.0

34:57:00.0

56:00.0

RA (J2000)

Dec (J2000)

OBSID 00555413000 / DATE-OBS 2013-05-08T17:13:59.1

UVOT Finding Chart