0246810121438.0

34.0

13:06:30.0

26.0

30.0

43:00.0

18:42:00.0

41:00.0

40:30.0

RA (J2000)

Dec (J2000)

OBSID 00555600000 / DATE-OBS 2013-05-11T11:45:23.3

UVOT Finding Chart