05101520253012.0

08.0

04.0

20:37:00.0

42:00.0

30.0

-24:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00556753000 / DATE-OBS 2013-05-27T14:23:34.1

UVOT Finding Chart