0510152025309:20:00.0

18:30.0

17:00.0

30.0

19:00.0

87:18:00.0

16:30.0

RA (J2000)

Dec (J2000)

OBSID 00556870000 / DATE-OBS 2013-05-28T16:42:49.8

UVOT Finding Chart