02468101214161820.0

10.0

1:37:00.0

07:30.0

08:00.0

30.0

09:00.0

-64:10:00.0

RA (J2000)

Dec (J2000)

OBSID 00556930000 / DATE-OBS 2013-05-29T11:29:55.7

UVOT Finding Chart