0510152025303530.0

5:48:00.0

30.0

47:00.0

57:00.0

82:56:00.0

55:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 00557274000 / DATE-OBS 2013-06-03T06:51:30.6

UVOT Finding Chart