024681016:41:00.0

50.0

40.0

40:30.0

15:00.0

30.0

68:14:00.0

13:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00557354000 / DATE-OBS 2013-06-04T06:59:04.9

UVOT Finding Chart