05101520253012.0

06.0

8:58:00.0

28:00.0

30.0

29:00.0

-33:30:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 00557508000 / DATE-OBS 2013-06-05T23:43:28.4

UVOT Finding Chart