0246810121442.0

38.0

34.0

16:37:30.0

30.0

49:00.0

29:48:00.0

47:00.0

46:30.0

RA (J2000)

Dec (J2000)

OBSID 00557589000 / DATE-OBS 2013-06-06T21:06:10.6

UVOT Finding Chart