012345678948.0

44.0

10:10:40.0

36.0

30.0

07:00.0

24:06:00.0

05:00.0

04:30.0

RA (J2000)

Dec (J2000)

OBSID 00557782000 / DATE-OBS 2013-06-09T03:10:01.6

UVOT Finding Chart