012345678912.0

06.0

3:35:00.0

08:30.0

09:00.0

30.0

-40:10:00.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00557828000 / DATE-OBS 2013-06-09T21:43:48.1

UVOT Finding Chart