051015202544.0

14:57:40.0

36.0

30.0

13:00.0

28:12:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 00557845000 / DATE-OBS 2013-06-10T03:14:44.6

UVOT Finding Chart