051015202532.0

26.0

17:04:20.0

14.0

41:30.0

42:00.0

30.0

-42:43:00.0

44:00.0

45:00.0

RA (J2000)

Dec (J2000)

OBSID 00557910000 / DATE-OBS 2013-06-11T03:36:38.8

UVOT Finding Chart