0102030405060708012:17:50.0

44.0

38.0

03:30.0

04:00.0

30.0

-37:05:00.0

06:00.0

RA (J2000)

Dec (J2000)

OBSID 00559132000 / DATE-OBS 2013-06-27T09:44:53.4

UVOT Finding Chart