0246810121417:54:30.0

26.0

22.0

19:00.0

30.0

-26:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 00559221000 / DATE-OBS 2013-06-28T07:28:49.4

UVOT Finding Chart