01234567891023:49:00.0

56.0

52.0

48:48.0

07:00.0

30.0

36:06:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 00559482000 / DATE-OBS 2013-07-01T04:20:25.0

UVOT Finding Chart