05101520253035404554.0

8:40:50.0

46.0

42.0

02:30.0

-45:03:00.0

30.0

04:00.0

RA (J2000)

Dec (J2000)

OBSID 00559642000 / DATE-OBS 2013-07-02T08:13:11.9

UVOT Finding Chart