010203040506014.0

15:20:10.0

06.0

02.0

39:00.0

30.0

0:38:00.0

37:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00563980000 / DATE-OBS 2013-07-25T12:28:59.7

UVOT Finding Chart