024681012141622:03:20.0

10.0

33:30.0

-65:34:00.0

30.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00564342000 / DATE-OBS 2013-07-27T17:43:45.0

UVOT Finding Chart