051015202526.0

11:20:20.0

14.0

32:00.0

30.0

-57:33:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00566561000 / DATE-OBS 2013-08-16T04:58:37.0

UVOT Finding Chart