0246810121416181:51:50.0

46.0

42.0

11:30.0

12:00.0

30.0

-3:13:00.0

14:00.0

RA (J2000)

Dec (J2000)

OBSID 00567163000 / DATE-OBS 2013-08-22T16:08:59.6

UVOT Finding Chart