0246810121418.0

14.0

19:15:10.0

06.0

30.0

58:00.0

10:57:00.0

56:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00567383000 / DATE-OBS 2013-08-24T23:56:02.9

UVOT Finding Chart