01234567834.0

23:54:30.0

26.0

22.0

30.0

27:00.0

29:26:00.0

25:00.0

24:00.0

RA (J2000)

Dec (J2000)

OBSID 00568849000 / DATE-OBS 2013-08-31T13:07:38.4

UVOT Finding Chart