05101520253035404512:49:50.0

46.0

42.0

09:30.0

-29:10:00.0

30.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00568855000 / DATE-OBS 2013-08-31T13:50:40.2

UVOT Finding Chart