0.51.52.53.54.5548.0

44.0

2:44:40.0

36.0

07:30.0

08:00.0

30.0

09:00.0

-26:10:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 00571830000 / DATE-OBS 2013-09-25T04:16:50.8

UVOT Finding Chart