012345614.0

2:49:10.0

06.0

28:00.0

30.0

7:27:00.0

26:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00574266000 / DATE-OBS 2013-10-11T22:22:35.2

UVOT Finding Chart